Pedestals Calib 8590.1

0 25 50

350 400 450

Entries Mean RMS 700 421.1 7.937

Hut 0.2.2 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 11.87 2.686

Hut 0.2.2 VADC counts events

0

25

50

300 350 400

Entries Mean RMS 700 333.5 7.489

Hut 0.2.3 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 11.73 2.316

Hut 0.2.3 VADC counts events

0 20 40

300 350 400

Entries Mean RMS 700 350.8 8.561

Hut 0.2.4 QADC counts events

0

200

20 40 60 80

Entries Mean RMS 700 12.80 3.775

Hut 0.2.4 VADC counts events

0 25 50

300 350 400

Entries Mean RMS 700 363.7 7.380

Hut 0.2.5 QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 15.36 6.957

Hut 0.2.5 VADC counts events

0 25 50

400 450 500

Entries Mean RMS 700 463.3 7.858

Hut 0.2.6 QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 13.08 7.041

Hut 0.2.6 VADC counts events

Pedestals Calib 8590.1

0 25 50

400 450 500

Entries Mean RMS 700 453.8 7.780

Hut 0.2.7 QADC counts events

0

20

40

300 350 400

Entries Mean RMS 700 342.3 8.967

Hut 0.2.7 VADC counts events

0

10

350 400 450

Entries Mean RMS 700 403.1 31.79

Hut 0.2.8 QADC counts events

0 100 200

20 40 60 80

Entries Mean RMS 700 19.85 2.767

Hut 0.2.8 VADC counts events

0 25 50

300 350 400

Entries Mean RMS 700 329.3 7.796

Hut 0.2.9 QADC counts events

0 100 200

20 40 60 80

Entries Mean RMS 700 17.60 2.872

Hut 0.2.9 VADC counts events

0

25

50

400 450 500

Entries Mean RMS 700 438.8 8.872

Hut 0.2.10QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 14.36 2.175

Hut 0.2.10VADC counts events

0

50

300 350 400

Entries Mean RMS 700 346.6 5.163

Hut 0.3.1 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 11.65 3.028

Hut 0.3.1 VADC counts events

Pedestals Calib 8590.1

0

50

400 450 500

Entries Mean RMS 700 430.4 4.876

Hut 0.3.2 QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 14.24 7.319

Hut 0.3.2 VADC counts events

0 25 50

350 400 450

Entries Mean RMS 700 389.0 5.501

Hut 0.3.3 QADC counts events

0 100 200

20 40 60 80

Entries Mean RMS 700 16.02 7.710

Hut 0.3.3 VADC counts events

0

50

300 350 400

Entries Mean RMS 700 360.3 4.802

Hut 0.3.4 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 16.20 2.642

Hut 0.3.4 VADC counts events

0

50

400 450 500

Entries Mean RMS 700 446.3 4.920

Hut 0.3.5 QADC counts events

0 50 100

20 40 60 80

Entries Mean RMS 700 18.66 9.165

Hut 0.3.5 VADC counts events

0

50

450 500 550

Entries Mean RMS 700 500.7 5.252

Hut 0.3.6 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 15.59 2.983

Hut 0.3.6 VADC counts events

Pedestals Calib 8590.1

0

20

400 450 500

Entries Mean RMS 700 436.3 19.03

Hut 0.3.7 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 18.19 3.190

Hut 0.3.7 VADC counts events

0

20

350 400 450

Entries Mean RMS 700 412.0 14.67

Hut 0.3.8 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 11.76 3.071

Hut 0.3.8 VADC counts events

0

50

300 350 400

Entries Mean RMS 700 341.1 4.957

Hut 0.3.9 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 15.10 8.858

Hut 0.3.9 VADC counts events

0 10 20

400 450 500

Entries Mean RMS 700 458.4 19.15

Hut 0.3.10QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 16.03 1.835

Hut 0.3.10VADC counts events

0

20

500 550 600

Entries Mean RMS 700 528.1 11.53

Hut 0.4.1 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 15.88 5.245

Hut 0.4.1 VADC counts events

Pedestals Calib 8590.1

0

50

400 450 500

Entries Mean RMS 700 445.2 4.243

Hut 0.4.2 QADC counts events

0

200

20 40 60 80

Entries Mean RMS 700 10.25 3.913

Hut 0.4.2 VADC counts events

0 20 40

300 350 400

Entries Mean RMS 700 326.6 6.378

Hut 0.4.3 QADC counts events

0 20 40

450 500 550

Entries Mean RMS 700 507.3 6.149

Hut 0.4.3 VADC counts events

0

50

100

300 350 400

Entries Mean RMS 700 342.3 4.174

Hut 0.4.4 QADC counts events

0 50 100

20 40 60 80

Entries Mean RMS 700 14.22 10.28

Hut 0.4.4 VADC counts events

0 25 50

250 300 350

Entries Mean RMS 700 303.0 6.040

Hut 0.4.5 QADC counts events

0 25 50

20 40 60 80

Entries Mean RMS 700 16.68 9.660

Hut 0.4.5 VADC counts events

0

50

350 400 450

Entries Mean RMS 700 402.3 4.733

Hut 0.4.6 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 15.62 2.229

Hut 0.4.6 VADC counts events

Pedestals Calib 8590.1

0

20

40

250 300 350

Entries Mean RMS 700 304.5 8.140

Hut 0.4.7 QADC counts events

0 25 50

300 350 400

Entries Mean RMS 700 366.1 6.099

Hut 0.4.7 VADC counts events

0

50

100

250 300 350

Entries Mean RMS 700 320.3 3.859

Hut 0.4.8 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 13.76 7.536

Hut 0.4.8 VADC counts events

0

50

300 350 400

Entries Mean RMS 700 366.2 5.271

Hut 0.4.9 QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 19.82 6.066

Hut 0.4.9 VADC counts events

0 25 50

350 400 450

Entries Mean RMS 700 414.3 5.434

Hut 0.4.10QADC counts events

0 100 200

20 40 60 80

Entries Mean RMS 700 17.52 7.766

Hut 0.4.10VADC counts events

0 25 50

300 350 400

Entries Mean RMS 700 371.5 5.275

Hut 0.5.1 QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 15.29 5.782

Hut 0.5.1 VADC counts events

Pedestals Calib 8590.1

0

50

400 450 500

Entries Mean RMS 700 442.4 5.056

Hut 0.5.2 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 11.48 6.649

Hut 0.5.2 VADC counts events

0

50

300 350 400

Entries Mean RMS 700 353.1 5.503

Hut 0.5.3 QADC counts events

0 50 100

20 40 60 80

Entries Mean RMS 700 20.78 3.475

Hut 0.5.3 VADC counts events

0

50

300 350 400

Entries Mean RMS 700 342.6 4.913

Hut 0.5.4 QADC counts events

0

25

50

20 40 60 80

Entries Mean RMS 700 15.60 11.48

Hut 0.5.4 VADC counts events

0 25 50

250 300 350

Entries Mean RMS 700 308.6 5.202

Hut 0.5.5 QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 17.54 1.878

Hut 0.5.5 VADC counts events

0

50

450 500 550

Entries Mean RMS 700 480.8 5.684

Hut 0.5.6 QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 18.66 4.009

Hut 0.5.6 VADC counts events

Pedestals Calib 8590.1

0

50

300 350 400

Entries Mean RMS 700 353.5 5.010

Hut 0.5.7 QADC counts events

0 50 100

20 40 60 80

Entries Mean RMS 700 16.79 2.435

Hut 0.5.7 VADC counts events

0

50

300 350 400

Entries Mean RMS 700 357.1 5.136

Hut 0.5.8 QADC counts events

0 100 200

20 40 60 80

Entries Mean RMS 700 14.19 7.540

Hut 0.5.8 VADC counts events

0

50

300 350 400

Entries Mean RMS 700 368.8 5.167

Hut 0.5.9 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 12.78 10.12

Hut 0.5.9 VADC counts events

0

50

400 450 500

Entries Mean RMS 700 433.9 5.367

Hut 0.5.10QADC counts events

0 100 200

20 40 60 80

Entries Mean RMS 700 20.73 7.686

Hut 0.5.10VADC counts events

0 25 50

250 300 350

Entries Mean RMS 700 321.7 5.764

Hut 0.6.1 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 16.06 8.735

Hut 0.6.1 VADC counts events

Pedestals Calib 8590.1

0 25 50

350 400 450

Entries Mean RMS 700 386.1 5.064

Hut 0.6.2 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 12.99 8.844

Hut 0.6.2 VADC counts events

0 25 50

250 300 350

Entries Mean RMS 700 301.7 5.266

Hut 0.6.3 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 16.41 2.833

Hut 0.6.3 VADC counts events

0 25 50

350 400 450

Entries Mean RMS 700 383.8 5.367

Hut 0.6.4 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 13.60 2.903

Hut 0.6.4 VADC counts events

0 25 50

250 300 350

Entries Mean RMS 700 308.6 6.286

Hut 0.6.5 QADC counts events

0 25 50

300 350 400

Entries Mean RMS 700 355.6 6.540

Hut 0.6.5 VADC counts events

0

20

40

400 450 500

Entries Mean RMS 700 435.4 8.853

Hut 0.6.6 QADC counts events

0

20

40

350 400 450

Entries Mean RMS 700 422.1 8.552

Hut 0.6.6 VADC counts events

Pedestals Calib 8590.1

0

20

40

300 350 400

Entries Mean RMS 700 337.7 8.858

Hut 0.6.7 QADC counts events

0

20

40

300 350 400

Entries Mean RMS 700 349.5 8.446

Hut 0.6.7 VADC counts events

0 25 50

300 350 400

Entries Mean RMS 700 359.0 6.861

Hut 0.6.8 QADC counts events

0 20 40

350 400 450

Entries Mean RMS 700 404.5 7.151

Hut 0.6.8 VADC counts events

0 25 50

350 400 450

Entries Mean RMS 700 421.9 5.890

Hut 0.6.9 QADC counts events

0 20 40

300 350 400

Entries Mean RMS 700 360.7 7.217

Hut 0.6.9 VADC counts events

0

25

50

400 450 500

Entries Mean RMS 700 460.2 6.459

Hut 0.6.10QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 16.77 16.14

Hut 0.6.10VADC counts events

0

20

40

300 350 400

Entries Mean RMS 700 361.6 10.35

Hut 0.7.1 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 12.47 3.038

Hut 0.7.1 VADC counts events

Pedestals Calib 8590.1

0

50

350 400 450

Entries Mean RMS 700 407.7 4.964

Hut 0.7.2 QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 11.48 4.621

Hut 0.7.2 VADC counts events

0

50

100

350 400 450

Entries Mean RMS 700 377.0 6.696

Hut 0.7.3 QADC counts events

0 100 200

20 40 60 80

Entries Mean RMS 700 12.14 6.071

Hut 0.7.3 VADC counts events

0

50

300 350 400

Entries Mean RMS 700 346.1 4.869

Hut 0.7.4 QADC counts events

0

200

20 40 60 80

Entries Mean RMS 700 12.24 8.047

Hut 0.7.4 VADC counts events

0

50

250 300 350

Entries Mean RMS 700 283.1 5.250

Hut 0.7.5 QADC counts events

0 20 40

350 400 450

Entries Mean RMS 700 401.0 6.439

Hut 0.7.5 VADC counts events

0 20 40

350 400 450

Entries Mean RMS 700 393.2 7.499

Hut 0.7.6 QADC counts events

0 25 50

400 450 500

Entries Mean RMS 700 440.0 6.752

Hut 0.7.6 VADC counts events

Pedestals Calib 8590.1

0

50

300 350 400

Entries Mean RMS 700 366.9 5.217

Hut 0.7.7 QADC counts events

0 25 50

350 400 450

Entries Mean RMS 700 393.2 5.604

Hut 0.7.7 VADC counts events

0 25 50

350 400 450

Entries Mean RMS 700 389.1 5.323

Hut 0.7.8 QADC counts events

0 20 40

400 450 500

Entries Mean RMS 700 453.3 6.278

Hut 0.7.8 VADC counts events

0 25 50

350 400 450

Entries Mean RMS 700 399.5 6.775

Hut 0.7.9 QADC counts events

0 20 40

350 400 450

Entries Mean RMS 700 382.1 6.088

Hut 0.7.9 VADC counts events

0 25 50

400 450 500

Entries Mean RMS 700 470.6 6.009

Hut 0.7.10QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 18.33 10.15

Hut 0.7.10VADC counts events

0 25 50

200 250 300

Entries Mean RMS 700 271.4 5.648

Hut 0.8.1 QADC counts events

0

20

40

300 350 400

Entries Mean RMS 700 339.5 7.360

Hut 0.8.1 VADC counts events

Pedestals Calib 8590.1

0

50

300 350 400

Entries Mean RMS 700 360.8 4.939

Hut 0.8.2 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 19.77 3.519

Hut 0.8.2 VADC counts events

0

50

300 350 400

Entries Mean RMS 700 326.2 4.754

Hut 0.8.3 QADC counts events

0

25

50

350 400 450

Entries Mean RMS 700 408.3 5.628

Hut 0.8.3 VADC counts events

0

50

100

250 300 350

Entries Mean RMS 700 277.7 5.319

Hut 0.8.4 QADC counts events

0 100 200

20 40 60 80

Entries Mean RMS 700 15.39 8.901

Hut 0.8.4 VADC counts events

0

50

300 350 400

Entries Mean RMS 700 346.5 4.282

Hut 0.8.5 QADC counts events

0

50

350 400 450

Entries Mean RMS 700 382.6 4.345

Hut 0.8.5 VADC counts events

0 25 50

350 400 450

Entries Mean RMS 700 386.6 4.685

Hut 0.8.6 QADC counts events

0 20 40

350 400 450

Entries Mean RMS 700 424.3 6.896

Hut 0.8.6 VADC counts events

Pedestals Calib 8590.1

0

50

200 250 300

Entries Mean RMS 700 254.6 4.100

Hut 0.8.7 QADC counts events

0

50

250 300 350 400

Entries Mean RMS 700 324.5 5.653

Hut 0.8.7 VADC counts events

0 25 50

200 250 300

Entries Mean RMS 700 269.5 10.26

Hut 0.8.8 QADC counts events

0 25 50

350 400 450

Entries Mean RMS 700 388.2 5.280

Hut 0.8.8 VADC counts events

0 25 50

300 350 400

Entries Mean RMS 700 349.5 5.990

Hut 0.8.9 QADC counts events

0 25 50

350 400 450

Entries Mean RMS 700 393.3 5.965

Hut 0.8.9 VADC counts events

0 25 50

400 450 500

Entries Mean RMS 700 456.8 5.225

Hut 0.8.10QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 19.61 12.50

Hut 0.8.10VADC counts events

0

50

200 250 300

Entries Mean RMS 700 264.8 5.140

Hut 0.9.1 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 14.86 10.05

Hut 0.9.1 VADC counts events

Pedestals Calib 8590.1

0

50

350 400 450

Entries Mean RMS 700 389.9 5.454

Hut 0.9.2 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 22.77 13.44

Hut 0.9.2 VADC counts events

0

25

50

300 350 400

Entries Mean RMS 700 347.4 6.645

Hut 0.9.3 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 14.70 10.33

Hut 0.9.3 VADC counts events

0

50

250 300 350

Entries Mean RMS 700 315.4 4.921

Hut 0.9.4 QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 17.35 15.47

Hut 0.9.4 VADC counts events

0

50

200 250 300

Entries Mean RMS 700 269.8 4.791

Hut 0.9.5 QADC counts events

0 20 40

250 300 350

Entries Mean RMS 700 315.6 6.426

Hut 0.9.5 VADC counts events

0

50

350 400 450

Entries Mean RMS 700 377.0 4.429

Hut 0.9.6 QADC counts events

0

50

300 350 400

Entries Mean RMS 700 374.4 5.176

Hut 0.9.6 VADC counts events

Pedestals Calib 8590.1

0

50

300 350 400

Entries Mean RMS 700 336.5 4.658

Hut 0.9.7 QADC counts events

0 25 50

250 300 350

Entries Mean RMS 700 278.5 5.557

Hut 0.9.7 VADC counts events

0

50

300 350 400

Entries Mean RMS 700 352.1 5.074

Hut 0.9.8 QADC counts events

0 25 50

400 450 500

Entries Mean RMS 700 429.8 5.256

Hut 0.9.8 VADC counts events

0

50

300 350 400

Entries Mean RMS 700 355.6 4.937

Hut 0.9.9 QADC counts events

0 25 50

300 350 400

Entries Mean RMS 700 350.2 5.668

Hut 0.9.9 VADC counts events

0 25 50

350 400 450

Entries Mean RMS 700 419.4 5.526

Hut 0.9.10QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 9.638 2.416

Hut 0.9.10VADC counts events

0 25 50

200 250 300

Entries Mean RMS 700 242.0 5.652

Hut 0.10.1QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 15.05 12.09

Hut 0.10.1VADC counts events

Pedestals Calib 8590.1

0

50

300 350 400

Entries Mean RMS 700 369.0 4.468

Hut 0.10.2QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 19.58 11.30

Hut 0.10.2VADC counts events

0

50

200 250 300

Entries Mean RMS 700 248.7 4.404

Hut 0.10.3QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 12.18 2.615

Hut 0.10.3VADC counts events

0

50

250 300 350

Entries Mean RMS 700 284.7 4.154

Hut 0.10.4QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 18.22 4.508

Hut 0.10.4VADC counts events

0

50

100 150 200

Entries Mean RMS 700 159.3 4.024

Hut 0.10.5QADC counts events

0

50

300 350 400

Entries Mean RMS 700 369.9 4.539

Hut 0.10.5VADC counts events

0

50

350 400 450

Entries Mean RMS 700 402.4 3.980

Hut 0.10.6QADC counts events

0 25 50

350 400 450

Entries Mean RMS 700 423.6 4.544

Hut 0.10.6VADC counts events

Pedestals Calib 8590.1

0

50

250 300 350

Entries Mean RMS 700 308.9 3.857

Hut 0.10.7QADC counts events

0

50

250 300 350

Entries Mean RMS 700 315.4 4.450

Hut 0.10.7VADC counts events

0

50

300 350 400

Entries Mean RMS 700 346.4 5.287

Hut 0.10.8QADC counts events

0

50

400 450 500

Entries Mean RMS 700 440.8 4.778

Hut 0.10.8VADC counts events

0

50

100

300 350 400

Entries Mean RMS 700 331.5 3.802

Hut 0.10.9QADC counts events

0 25 50

300 350 400

Entries Mean RMS 700 350.2 5.034

Hut 0.10.9VADC counts events

0 25 50

400 450 500

Entries Mean RMS 700 459.8 5.079

Hut 0.10.10QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 9.970 2.386

Hut 0.10.10VADC counts events

0

50

250 300 350

Entries Mean RMS 700 304.5 4.475

Hut 0.11.1QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 12.44 5.497

Hut 0.11.1VADC counts events

Pedestals Calib 8590.1

0

50

100

250 300 350

Entries Mean RMS 700 310.7 4.109

Hut 0.11.2QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 14.01 3.702

Hut 0.11.2VADC counts events

0

50

350 400 450

Entries Mean RMS 700 375.6 5.312

Hut 0.11.3QADC counts events

0 25 50

20 40 60 80

Entries Mean RMS 700 21.46 15.96

Hut 0.11.3VADC counts events

0

50

100

350 400 450

Entries Mean RMS 700 375.7 3.750

Hut 0.11.4QADC counts events

0 100 200

20 40 60 80

Entries Mean RMS 700 10.38 7.298

Hut 0.11.4VADC counts events

0

50

250 300 350

Entries Mean RMS 700 308.7 3.932

Hut 0.11.5QADC counts events

0

200

20 40 60 80

Entries Mean RMS 700 16.01 7.711

Hut 0.11.5VADC counts events

0

50

350 400 450

Entries Mean RMS 700 420.0 3.811

Hut 0.11.6QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 17.71 4.703

Hut 0.11.6VADC counts events

Pedestals Calib 8590.1

0

50

350 400 450

Entries Mean RMS 700 382.4 3.588

Hut 0.11.7QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 19.44 10.60

Hut 0.11.7VADC counts events

0

50

300 350 400

Entries Mean RMS 700 361.3 3.796

Hut 0.11.8QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 16.71 7.152

Hut 0.11.8VADC counts events

0

50

100

250 300 350

Entries Mean RMS 700 320.3 3.446

Hut 0.11.9QADC counts events

0

50

20 40 60 80

Entries Mean RMS 700 18.48 13.56

Hut 0.11.9VADC counts events

0

50

100

350 400 450

Entries Mean RMS 700 383.2 3.436

Hut 0.11.10QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 20.39 12.64

Hut 0.11.10VADC counts events

0

25

50

250 300 350

Entries Mean RMS 700 307.2 6.110

Hut 0.12.1QADC counts events

0 50 100

20 40 60 80

Entries Mean RMS 700 14.44 15.34

Hut 0.12.1VADC counts events

Pedestals Calib 8590.1

0 25 50

350 400 450

Entries Mean RMS 700 393.2 5.680

Hut 0.12.2QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 12.96 2.873

Hut 0.12.2VADC counts events

0

25

50

250 300 350

Entries Mean RMS 700 284.9 6.745

Hut 0.12.3QADC counts events

0 20 40

300 350 400

Entries Mean RMS 700 336.7 6.287

Hut 0.12.3VADC counts events

0 25 50

300 350 400

Entries Mean RMS 700 340.0 5.270

Hut 0.12.4QADC counts events

0 100 200

20 40 60 80

Entries Mean RMS 700 15.67 3.067

Hut 0.12.4VADC counts events

0

50

300 350 400

Entries Mean RMS 700 361.4 4.679

Hut 0.12.5QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 18.16 2.643

Hut 0.12.5VADC counts events

0 25 50

400 450 500

Entries Mean RMS 700 449.5 5.990

Hut 0.12.6QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 11.09 7.852

Hut 0.12.6VADC counts events

Pedestals Calib 8590.1

0 25 50

300 350 400

Entries Mean RMS 700 373.9 6.795

Hut 0.12.7QADC counts events

0

25

50

300 350 400

Entries Mean RMS 700 368.1 6.430

Hut 0.12.7VADC counts events

0

50

350 400 450

Entries Mean RMS 700 415.6 4.720

Hut 0.12.8QADC counts events

0

200

20 40 60 80

Entries Mean RMS 700 17.49 3.403

Hut 0.12.8VADC counts events

0

50

300 350 400

Entries Mean RMS 700 373.5 4.826

Hut 0.12.9QADC counts events

0 100 200

20 40 60 80

Entries Mean RMS 700 18.00 5.746

Hut 0.12.9VADC counts events

0

50

400 450 500

Entries Mean RMS 700 438.5 5.928

Hut 0.12.10QADC counts events

0

20

50 100 150

Entries Mean RMS 700 115.1 17.94

Hut 0.12.10VADC counts events

0

50

300 350 400

Entries Mean RMS 700 327.9 4.123

Hut 0.13.1QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 14.84 10.71

Hut 0.13.1VADC counts events

Pedestals Calib 8590.1

0

50

400 450 500

Entries Mean RMS 700 439.3 4.038

Hut 0.13.2QADC counts events

0 50 100

20 40 60 80

Entries Mean RMS 700 14.38 13.51

Hut 0.13.2VADC counts events

0

50

300 350 400

Entries Mean RMS 700 343.3 5.286

Hut 0.13.3QADC counts events

0

50

20 40 60 80

Entries Mean RMS 700 22.29 16.39

Hut 0.13.3VADC counts events

0 20 40

300 350 400

Entries Mean RMS 700 369.9 9.176

Hut 0.13.4QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 7.743 3.791

Hut 0.13.4VADC counts events

0

20

350 400 450

Entries Mean RMS 700 377.4 14.30

Hut 0.13.5QADC counts events

0

200

20 40 60 80

Entries Mean RMS 700 11.88 2.214

Hut 0.13.5VADC counts events

0

20

40

300 350 400

Entries Mean RMS 700 369.1 11.91

Hut 0.13.6QADC counts events

0

200

20 40 60 80

Entries Mean RMS 700 19.50 7.224

Hut 0.13.6VADC counts events

Pedestals Calib 8590.1

0

50

300 350 400 450

Entries Mean RMS 700 375.0 4.707

Hut 0.13.7QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 15.46 8.122

Hut 0.13.7VADC counts events

0

50

350 400 450

Entries Mean RMS 700 377.5 6.308

Hut 0.13.8QADC counts events

0 100 200

20 40 60 80

Entries Mean RMS 700 14.66 10.84

Hut 0.13.8VADC counts events

0

50

350 400 450

Entries Mean RMS 700 389.1 4.649

Hut 0.13.9QADC counts events

0 50 100

20 40 60 80

Entries Mean RMS 700 6.433 3.980

Hut 0.13.9VADC counts events

0 20 40

450 500 550

Entries Mean RMS 700 485.7 9.739

Hut 0.13.10QADC counts events

0

100

200

20 40 60 80

Entries Mean RMS 700 10.27 6.365

Hut 0.13.10VADC counts events

0

25

50

400 450 500

Entries Mean RMS 700 455.7 7.442

Hut 0.14.2QADC counts events

0 100 200

20 40 60 80

Entries Mean RMS 700 10.42 9.022

Hut 0.14.2VADC counts events

Pedestals Calib 8590.1

0

50

350 400 450

Entries Mean RMS 700 421.7 4.724

Hut 0.14.3QADC counts events

0 50 100

20 40 60 80

Entries Mean RMS 700 18.36 9.858

Hut 0.14.3VADC counts events

0

50

350 400 450

Entries Mean RMS 700 402.6 4.440

Hut 0.14.4QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 20.85 8.077

Hut 0.14.4VADC counts events

0

50

400 450 500

Entries Mean RMS 700 437.6 4.026

Hut 0.14.5QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 12.36 5.879

Hut 0.14.5VADC counts events

0

50

450 500 550

Entries Mean RMS 700 500.9 4.077

Hut 0.14.6QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 18.78 2.576

Hut 0.14.6VADC counts events

0

50

100

400 450 500

Entries Mean RMS 700 437.0 3.769

Hut 0.14.7QADC counts events

0

20

40

300 350 400

Entries Mean RMS 700 351.6 9.046

Hut 0.14.7VADC counts events

Pedestals Calib 8590.1

0

50

350 400 450

Entries Mean RMS 700 399.1 4.243

Hut 0.14.8QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 11.69 2.026

Hut 0.14.8VADC counts events

0 25 50

350 400 450

Entries Mean RMS 700 393.5 7.185

Hut 0.14.9QADC counts events

0

100

20 40 60 80

Entries Mean RMS 700 12.62 2.188

Hut 0.14.9VADC counts events

0

50

400 450 500

Entries Mean RMS 700 427.5 4.010

Hut 0.14.10QADC counts events

0 100 200

20 40 60 80

Entries Mean RMS 700 16.53 7.458

Hut 0.14.10VADC counts events

LP calibrations Calib 8590.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1552. 2.859

Hut 0.2.2 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1552. 2.859

Hut 0.2.2

Hut 0.2.2 TDC counts

Events

HImean = 613.9 LOmean = 16.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1649. 2.486

Hut 0.2.3 TDC counts

Events

0

100

1600 1650 1700

Entries Mean RMS 800 1649. 2.486

Hut 0.2.3

Hut 0.2.3 TDC counts

Events

HImean = 1158.1 LOmean = 16.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1649. 2.727

Hut 0.2.4 TDC counts

Events

0

100

1600 1650 1700 1750

Entries Mean RMS 800 1649. 2.727

Hut 0.2.4

Hut 0.2.4 TDC counts

Events

HImean = 771.9 LOmean = 21.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1673. 2.388

Hut 0.2.5 TDC counts

Events

0

100

1650 1700 1750

Entries Mean RMS 800 1673. 2.388

Hut 0.2.5

Hut 0.2.5 TDC counts

Events

HImean = 557.6 LOmean = 14.9

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1629. 2.562

Hut 0.2.6 TDC counts

Events

0

100

200

1600 1650 1700

Entries Mean RMS 800 1629. 2.562

Hut 0.2.6

Hut 0.2.6 TDC counts

Events

HImean = 829.8 LOmean = 17.1

LP calibrations Calib 8590.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1423. 2.960

Hut 0.2.7 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1423. 2.960

Hut 0.2.7

Hut 0.2.7 TDC counts

Events

HImean = 934.9 LOmean = 352.2

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 0.2.8 TDC counts

Events

0

500

0 25 50 75 100

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 0.2.8

Hut 0.2.8 TDC counts

Events

HImean = 402.7 LOmean = 27.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1603. 2.887

Hut 0.2.9 TDC counts

Events

0

100

1600 1650 1700

Entries Mean RMS 800 1603. 2.887

Hut 0.2.9

Hut 0.2.9 TDC counts

Events

HImean = 591.8 LOmean = 21.5

0

50

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1643. 3.691

Hut 0.2.10 TDC counts

Events

0

50

100

1600 1650 1700

Entries Mean RMS 800 1643. 3.691

Hut 0.2.10

Hut 0.2.10 TDC counts

Events

HImean = 765.3 LOmean = 30.4

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 0.3.1 TDC counts

Events

0

500

0 25 50 75 100

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 0.3.1

Hut 0.3.1 TDC counts

Events

HImean = 349.5 LOmean = 11.8

LP calibrations Calib 8590.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1659. 23.74

Hut 0.3.2 TDC counts

Events

0

100

200

1650 1700 1750

Entries Mean RMS 800 1659. 23.74

Hut 0.3.2

Hut 0.3.2 TDC counts

Events

HImean = 877.7 LOmean = 17.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1636. 2.658

Hut 0.3.3 TDC counts

Events

0

100

1600 1650 1700

Entries Mean RMS 800 1636. 2.658

Hut 0.3.3

Hut 0.3.3 TDC counts

Events

HImean = 761.7 LOmean = 22.5

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1701. 2.232

Hut 0.3.4 TDC counts

Events

0

100

200

1650 1700 1750 1800

Entries Mean RMS 800 1701. 2.232

Hut 0.3.4

Hut 0.3.4 TDC counts

Events

HImean = 694.8 LOmean = 20.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1651. 2.476

Hut 0.3.5 TDC counts

Events

0

100

200

1650 1700 1750

Entries Mean RMS 800 1651. 2.476

Hut 0.3.5

Hut 0.3.5 TDC counts

Events

HImean = 786.2 LOmean = 16.0

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1721. 2.307

Hut 0.3.6 TDC counts

Events

0

100

200

1700 1750 1800

Entries Mean RMS 800 1721. 2.307

Hut 0.3.6

Hut 0.3.6 TDC counts

Events

HImean = 781.2 LOmean = 23.5

LP calibrations Calib 8590.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1643. 2.502

Hut 0.3.7 TDC counts

Events

0

100

1600 1650 1700

Entries Mean RMS 800 1643. 2.502

Hut 0.3.7

Hut 0.3.7 TDC counts

Events

HImean = 723.1 LOmean = 32.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1742. 2.288

Hut 0.3.8 TDC counts

Events

0

100

200

1700 1750 1800

Entries Mean RMS 800 1742. 2.288

Hut 0.3.8

Hut 0.3.8 TDC counts

Events

HImean = 623.5 LOmean = 17.5

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 0.3.9 TDC counts

Events

0

500

0 25 50 75 100

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 0.3.9

Hut 0.3.9 TDC counts

Events

HImean = 342.6 LOmean = 15.2

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 1691. 3.254

Hut 0.3.10 TDC counts

Events

0 50 100

1650 1700 1750

Entries Mean RMS 800 1691. 3.254

Hut 0.3.10

Hut 0.3.10 TDC counts

Events

HImean = 577.7 LOmean = 16.5

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 0.4.1 TDC counts

Events

0

500

0 25 50 75 100

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 0.4.1

Hut 0.4.1 TDC counts

Events

HImean = 535.1 LOmean = 29.8

LP calibrations Calib 8590.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1645. 2.515

Hut 0.4.2 TDC counts

Events

0

100

200

1600 1650 1700

Entries Mean RMS 800 1645. 2.515

Hut 0.4.2

Hut 0.4.2 TDC counts

Events

HImean = 655.4 LOmean = 17.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1462. 2.726

Hut 0.4.3 TDC counts

Events

0

100

1450 1500 1550

Entries Mean RMS 800 1462. 2.726

Hut 0.4.3

Hut 0.4.3 TDC counts

Events

HImean = 769.7 LOmean = 531.2

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 1613. 3.137

Hut 0.4.4 TDC counts

Events

0 50 100

1600 1650 1700

Entries Mean RMS 800 1613. 3.137

Hut 0.4.4

Hut 0.4.4 TDC counts

Events

HImean = 779.8 LOmean = 11.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1585. 2.747

Hut 0.4.5 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1585. 2.747

Hut 0.4.5

Hut 0.4.5 TDC counts

Events

HImean = 841.7 LOmean = 31.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1665. 51.68

Hut 0.4.6 TDC counts

Events

0

100

1650 1700 1750

Entries Mean RMS 800 1665. 51.68

Hut 0.4.6

Hut 0.4.6 TDC counts

Events

HImean = 793.8 LOmean = 25.4

LP calibrations Calib 8590.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1447. 2.529

Hut 0.4.7 TDC counts

Events

0

100

200

1400 1450 1500

Entries Mean RMS 800 1447. 2.529

Hut 0.4.7

Hut 0.4.7 TDC counts

Events

HImean = 677.7 LOmean = 374.1

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 0.4.8 TDC counts

Events

0

500

0 25 50 75 100

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 0.4.8

Hut 0.4.8 TDC counts

Events

HImean = 317.7 LOmean = 9.7

0

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1664. 2.386

Hut 0.4.9 TDC counts

Events

0

200

1650 1700 1750

Entries Mean RMS 800 1664. 2.386

Hut 0.4.9

Hut 0.4.9 TDC counts

Events

HImean = 624.6 LOmean = 22.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1775. 2.596

Hut 0.4.10 TDC counts

Events

0

100

1750 1800 1850

Entries Mean RMS 800 1775. 2.596

Hut 0.4.10

Hut 0.4.10 TDC counts

Events

HImean = 666.3 LOmean = 25.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1596. 56.52

Hut 0.5.1 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1596. 56.52

Hut 0.5.1

Hut 0.5.1 TDC counts

Events

HImean = 718.4 LOmean = 20.7

LP calibrations Calib 8590.1

0 100 200

0 1000 2000 3000 4000

Entries Mean RMS 800 1641. 2.258

Hut 0.5.2 TDC counts

Events

0 100 200

1600 1650 1700

Entries Mean RMS 800 1641. 2.258

Hut 0.5.2

Hut 0.5.2 TDC counts

Events

HImean = 739.0 LOmean = 17.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1643. 2.971

Hut 0.5.3 TDC counts

Events

0

100

1600 1650 1700

Entries Mean RMS 800 1643. 2.971

Hut 0.5.3

Hut 0.5.3 TDC counts

Events

HImean = 604.1 LOmean = 30.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1644. 2.490

Hut 0.5.4 TDC counts

Events

0

100

200

1600 1650 1700

Entries Mean RMS 800 1644. 2.490

Hut 0.5.4

Hut 0.5.4 TDC counts

Events

HImean = 644.4 LOmean = 14.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1689. 2.298

Hut 0.5.5 TDC counts

Events

0

100

200

1650 1700 1750

Entries Mean RMS 800 1689. 2.298

Hut 0.5.5

Hut 0.5.5 TDC counts

Events

HImean = 811.2 LOmean = 36.5

0 100 200

0 1000 2000 3000 4000

Entries Mean RMS 800 1643. 2.386

Hut 0.5.6 TDC counts

Events

0 100 200

1600 1650 1700

Entries Mean RMS 800 1643. 2.386

Hut 0.5.6

Hut 0.5.6 TDC counts

Events

HImean = 479.5 LOmean = 33.3

LP calibrations Calib 8590.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1591. 2.396

Hut 0.5.7 TDC counts

Events

0

100

200

1550 1600 1650

Entries Mean RMS 800 1591. 2.396

Hut 0.5.7

Hut 0.5.7 TDC counts

Events

HImean = 575.9 LOmean = 23.3

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1722. 2.077

Hut 0.5.8 TDC counts

Events

0

100

200

1700 1750 1800

Entries Mean RMS 800 1722. 2.077

Hut 0.5.8

Hut 0.5.8 TDC counts

Events

HImean = 631.4 LOmean = 16.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1644. 2.793

Hut 0.5.9 TDC counts

Events

0

100

1600 1650 1700

Entries Mean RMS 800 1644. 2.793

Hut 0.5.9

Hut 0.5.9 TDC counts

Events

HImean = 606.9 LOmean = 18.3

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1525. 2.689

Hut 0.5.10 TDC counts

Events

0

100

200

1500 1550 1600

Entries Mean RMS 800 1525. 2.689

Hut 0.5.10

Hut 0.5.10 TDC counts

Events

HImean = 763.1 LOmean = 28.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1394. 2.409

Hut 0.6.1 TDC counts

Events

0

100

1350 1400 1450

Entries Mean RMS 800 1394. 2.409

Hut 0.6.1

Hut 0.6.1 TDC counts

Events

HImean = 743.8 LOmean = 15.2

LP calibrations Calib 8590.1

0 100 200

0 1000 2000 3000 4000

Entries Mean RMS 800 1443. 1.941

Hut 0.6.2 TDC counts

Events

0 100 200

1400 1450 1500

Entries Mean RMS 800 1443. 1.941

Hut 0.6.2

Hut 0.6.2 TDC counts

Events

HImean = 611.8 LOmean = 18.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1511. 2.612

Hut 0.6.3 TDC counts

Events

0

100

1500 1550 1600

Entries Mean RMS 800 1511. 2.612

Hut 0.6.3

Hut 0.6.3 TDC counts

Events

HImean = 575.7 LOmean = 24.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1475. 2.612

Hut 0.6.4 TDC counts

Events

0

100

1450 1500 1550

Entries Mean RMS 800 1475. 2.612

Hut 0.6.4

Hut 0.6.4 TDC counts

Events

HImean = 827.7 LOmean = 21.6

0 100 200

0 1000 2000 3000 4000

Entries Mean RMS 800 1253. 2.317

Hut 0.6.5 TDC counts

Events

0 100 200

1250 1300 1350

Entries Mean RMS 800 1253. 2.317

Hut 0.6.5

Hut 0.6.5 TDC counts

Events

HImean = 1047.5 LOmean = 362.8

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1276. 2.316

Hut 0.6.6 TDC counts

Events

0

100

200

1250 1300 1350

Entries Mean RMS 800 1276. 2.316

Hut 0.6.6

Hut 0.6.6 TDC counts

Events

HImean = 754.0 LOmean = 415.7

LP calibrations Calib 8590.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1299. 2.659

Hut 0.6.7 TDC counts

Events

0

100

1250 1300 1350 1400

Entries Mean RMS 800 1299. 2.659

Hut 0.6.7

Hut 0.6.7 TDC counts

Events

HImean = 753.1 LOmean = 349.5

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 1338. 2.887

Hut 0.6.8 TDC counts

Events

0 50 100

1300 1350 1400

Entries Mean RMS 800 1338. 2.887

Hut 0.6.8

Hut 0.6.8 TDC counts

Events

HImean = 751.6 LOmean = 406.7

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1283. 2.594

Hut 0.6.9 TDC counts

Events

0

100

200

1250 1300 1350

Entries Mean RMS 800 1283. 2.594

Hut 0.6.9

Hut 0.6.9 TDC counts

Events

HImean = 1227.8 LOmean = 378.5

0 100 200

0 1000 2000 3000 4000

Entries Mean RMS 800 1549. 2.196

Hut 0.6.10 TDC counts

Events

0 100 200

1500 1550 1600 1650

Entries Mean RMS 800 1549. 2.196

Hut 0.6.10

Hut 0.6.10 TDC counts

Events

HImean = 737.8 LOmean = 24.0

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 1509. 3.039

Hut 0.7.1 TDC counts

Events

0 50 100

1500 1550 1600

Entries Mean RMS 800 1509. 3.039

Hut 0.7.1

Hut 0.7.1 TDC counts

Events

HImean = 687.9 LOmean = 14.8

LP calibrations Calib 8590.1

0 100 200

0 1000 2000 3000 4000

Entries Mean RMS 800 1490. 2.456

Hut 0.7.2 TDC counts

Events

0 100 200

1450 1500 1550

Entries Mean RMS 800 1490. 2.456

Hut 0.7.2

Hut 0.7.2 TDC counts

Events

HImean = 786.1 LOmean = 16.4

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 1477. 4.940

Hut 0.7.3 TDC counts

Events

0 50 100

1450 1500 1550

Entries Mean RMS 800 1477. 4.940

Hut 0.7.3

Hut 0.7.3 TDC counts

Events

HImean = 602.9 LOmean = 17.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1518. 2.228

Hut 0.7.4 TDC counts

Events

0

100

200

1500 1550 1600

Entries Mean RMS 800 1518. 2.228

Hut 0.7.4

Hut 0.7.4 TDC counts

Events

HImean = 621.0 LOmean = 15.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1332. 2.657

Hut 0.7.5 TDC counts

Events

0

100

1300 1350 1400

Entries Mean RMS 800 1332. 2.657

Hut 0.7.5

Hut 0.7.5 TDC counts

Events

HImean = 664.9 LOmean = 402.8

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1313. 6.501

Hut 0.7.6 TDC counts

Events

0

100

200

1300 1350 1400

Entries Mean RMS 800 1313. 6.501

Hut 0.7.6

Hut 0.7.6 TDC counts

Events

HImean = 741.9 LOmean = 445.6

LP calibrations Calib 8590.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1328. 2.417

Hut 0.7.7 TDC counts

Events

0

100

1300 1350 1400

Entries Mean RMS 800 1328. 2.417

Hut 0.7.7

Hut 0.7.7 TDC counts

Events

HImean = 722.1 LOmean = 398.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1443. 2.434

Hut 0.7.8 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1443. 2.434

Hut 0.7.8

Hut 0.7.8 TDC counts

Events

HImean = 1074.0 LOmean = 475.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1264. 2.627

Hut 0.7.9 TDC counts

Events

0

100

1250 1300 1350

Entries Mean RMS 800 1264. 2.627

Hut 0.7.9

Hut 0.7.9 TDC counts

Events

HImean = 565.9 LOmean = 386.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1554. 2.311

Hut 0.7.10 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1554. 2.311

Hut 0.7.10

Hut 0.7.10 TDC counts

Events

HImean = 952.9 LOmean = 29.0

0 100 200

0 1000 2000 3000 4000

Entries Mean RMS 800 1309. 46.37

Hut 0.8.1 TDC counts

Events

0 100 200

1300 1350 1400

Entries Mean RMS 800 1309. 46.37

Hut 0.8.1

Hut 0.8.1 TDC counts

Events

HImean = 555.9 LOmean = 324.8

LP calibrations Calib 8590.1

0

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1500. 1.984

Hut 0.8.2 TDC counts

Events

0

200

1450 1500 1550 1600

Entries Mean RMS 800 1500. 1.984

Hut 0.8.2

Hut 0.8.2 TDC counts

Events

HImean = 674.4 LOmean = 24.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1304. 7.493

Hut 0.8.3 TDC counts

Events

0

100

1300 1350 1400

Entries Mean RMS 800 1304. 7.493

Hut 0.8.3

Hut 0.8.3 TDC counts

Events

HImean = 780.9 LOmean = 414.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1512. 2.771

Hut 0.8.4 TDC counts

Events

0

100

1500 1550 1600

Entries Mean RMS 800 1512. 2.771

Hut 0.8.4

Hut 0.8.4 TDC counts

Events

HImean = 507.2 LOmean = 22.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1227. 2.639

Hut 0.8.5 TDC counts

Events

0

100

1200 1250 1300

Entries Mean RMS 800 1227. 2.639

Hut 0.8.5

Hut 0.8.5 TDC counts

Events

HImean = 834.2 LOmean = 391.3

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1273. 2.067

Hut 0.8.6 TDC counts

Events

0

100

200

1250 1300 1350

Entries Mean RMS 800 1273. 2.067

Hut 0.8.6

Hut 0.8.6 TDC counts

Events

HImean = 667.8 LOmean = 409.8

LP calibrations Calib 8590.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1246. 2.656

Hut 0.8.7 TDC counts

Events

0

100

1200 1250 1300

Entries Mean RMS 800 1246. 2.656

Hut 0.8.7

Hut 0.8.7 TDC counts

Events

HImean = 751.0 LOmean = 326.6

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1342. 9.865

Hut 0.8.8 TDC counts

Events

0

100

200

1300 1350 1400

Entries Mean RMS 800 1342. 9.865

Hut 0.8.8

Hut 0.8.8 TDC counts

Events

HImean = 873.4 LOmean = 403.6

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1308. 2.160

Hut 0.8.9 TDC counts

Events

0

100

200

1300 1350 1400

Entries Mean RMS 800 1308. 2.160

Hut 0.8.9

Hut 0.8.9 TDC counts

Events

HImean = 1187.8 LOmean = 406.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1165. 41.30

Hut 0.8.10 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1165. 41.30

Hut 0.8.10

Hut 0.8.10 TDC counts

Events

HImean = 572.6 LOmean = 22.0

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1385. 2.124

Hut 0.9.1 TDC counts

Events

0

100

200

1350 1400 1450

Entries Mean RMS 800 1385. 2.124

Hut 0.9.1

Hut 0.9.1 TDC counts

Events

HImean = 587.5 LOmean = 11.0

LP calibrations Calib 8590.1

0

50

0 1000 2000 3000 4000

Entries Mean RMS 800 1447. 5.291

Hut 0.9.2 TDC counts

Events

0

50

1400 1450 1500

Entries Mean RMS 800 1447. 5.291

Hut 0.9.2

Hut 0.9.2 TDC counts

Events

HImean = 692.1 LOmean = 21.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1421. 2.429

Hut 0.9.3 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1421. 2.429

Hut 0.9.3

Hut 0.9.3 TDC counts

Events

HImean = 669.1 LOmean = 22.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1581. 3.003

Hut 0.9.4 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1581. 3.003

Hut 0.9.4

Hut 0.9.4 TDC counts

Events

HImean = 970.9 LOmean = 20.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1303. 2.632

Hut 0.9.5 TDC counts

Events

0

100

1300 1350 1400

Entries Mean RMS 800 1303. 2.632

Hut 0.9.5

Hut 0.9.5 TDC counts

Events

HImean = 536.6 LOmean = 322.5

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1349. 2.329

Hut 0.9.6 TDC counts

Events

0

100

200

1300 1350 1400 1450

Entries Mean RMS 800 1349. 2.329

Hut 0.9.6

Hut 0.9.6 TDC counts

Events

HImean = 601.3 LOmean = 375.7

LP calibrations Calib 8590.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1283. 45.43

Hut 0.9.7 TDC counts

Events

0

100

1250 1300 1350

Entries Mean RMS 800 1283. 45.43

Hut 0.9.7

Hut 0.9.7 TDC counts

Events

HImean = 742.1 LOmean = 288.5

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1331. 2.885

Hut 0.9.8 TDC counts

Events

0

100

200

1300 1350 1400

Entries Mean RMS 800 1331. 2.885

Hut 0.9.8

Hut 0.9.8 TDC counts

Events

HImean = 564.2 LOmean = 431.3

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1310. 2.262

Hut 0.9.9 TDC counts

Events

0

100

200

1300 1350 1400

Entries Mean RMS 800 1310. 2.262

Hut 0.9.9

Hut 0.9.9 TDC counts

Events

HImean = 958.7 LOmean = 353.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1381. 2.667

Hut 0.9.10 TDC counts

Events

0

100

1350 1400 1450

Entries Mean RMS 800 1381. 2.667

Hut 0.9.10

Hut 0.9.10 TDC counts

Events

HImean = 1437.0 LOmean = 52.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1681. 2.289

Hut 0.10.1 TDC counts

Events

0

100

1650 1700 1750

Entries Mean RMS 800 1681. 2.289

Hut 0.10.1

Hut 0.10.1 TDC counts

Events

HImean = 492.2 LOmean = 11.3

LP calibrations Calib 8590.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1661. 3.058

Hut 0.10.2 TDC counts

Events

0

100

200

1650 1700 1750

Entries Mean RMS 800 1661. 3.058

Hut 0.10.2

Hut 0.10.2 TDC counts

Events

HImean = 670.8 LOmean = 15.5

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1693. 2.266

Hut 0.10.3 TDC counts

Events

0

100

200

1650 1700 1750

Entries Mean RMS 800 1693. 2.266

Hut 0.10.3

Hut 0.10.3 TDC counts

Events

HImean = 519.4 LOmean = 20.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1683. 2.702

Hut 0.10.4 TDC counts

Events

0

100

1650 1700 1750

Entries Mean RMS 800 1683. 2.702

Hut 0.10.4

Hut 0.10.4 TDC counts

Events

HImean = 667.7 LOmean = 26.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1540. 2.878

Hut 0.10.5 TDC counts

Events

0

100

1500 1550 1600

Entries Mean RMS 800 1540. 2.878

Hut 0.10.5

Hut 0.10.5 TDC counts

Events

HImean = 722.7 LOmean = 379.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1447. 2.551

Hut 0.10.6 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1447. 2.551

Hut 0.10.6

Hut 0.10.6 TDC counts

Events

HImean = 859.4 LOmean = 425.9

LP calibrations Calib 8590.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1485. 52.56

Hut 0.10.7 TDC counts

Events

0

100

200

1450 1500 1550

Entries Mean RMS 800 1485. 52.56

Hut 0.10.7

Hut 0.10.7 TDC counts

Events

HImean = 1101.7 LOmean = 325.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1539. 2.809

Hut 0.10.8 TDC counts

Events

0

100

1500 1550 1600

Entries Mean RMS 800 1539. 2.809

Hut 0.10.8

Hut 0.10.8 TDC counts

Events

HImean = 786.8 LOmean = 441.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1453. 2.950

Hut 0.10.9 TDC counts

Events

0

100

1450 1500 1550

Entries Mean RMS 800 1453. 2.950

Hut 0.10.9

Hut 0.10.9 TDC counts

Events

HImean = 795.3 LOmean = 348.8

0

50

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1149. 4.070

Hut 0.10.10 TDC counts

Events

0

50

100

1100 1150 1200 1250

Entries Mean RMS 800 1149. 4.070

Hut 0.10.10

Hut 0.10.10 TDC counts

Events

HImean = 553.9 LOmean = 35.3

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 1632. 3.090

Hut 0.11.1 TDC counts

Events

0 50 100

1600 1650 1700

Entries Mean RMS 800 1632. 3.090

Hut 0.11.1

Hut 0.11.1 TDC counts

Events

HImean = 468.9 LOmean = 23.9

LP calibrations Calib 8590.1

0 100 200

0 1000 2000 3000 4000

Entries Mean RMS 800 1685. 1.887

Hut 0.11.2 TDC counts

Events

0 100 200

1650 1700 1750

Entries Mean RMS 800 1685. 1.887

Hut 0.11.2

Hut 0.11.2 TDC counts

Events

HImean = 509.8 LOmean = 23.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1611. 2.535

Hut 0.11.3 TDC counts

Events

0

100

1600 1650 1700

Entries Mean RMS 800 1611. 2.535

Hut 0.11.3

Hut 0.11.3 TDC counts

Events

HImean = 539.8 LOmean = 21.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1613. 2.389

Hut 0.11.4 TDC counts

Events

0

100

1600 1650 1700

Entries Mean RMS 800 1613. 2.389

Hut 0.11.4

Hut 0.11.4 TDC counts

Events

HImean = 628.5 LOmean = 15.7

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1665. 2.228

Hut 0.11.5 TDC counts

Events

0

100

200

1650 1700 1750

Entries Mean RMS 800 1665. 2.228

Hut 0.11.5

Hut 0.11.5 TDC counts

Events

HImean = 662.0 LOmean = 21.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1630. 16.81

Hut 0.11.6 TDC counts

Events

0

100

1600 1650 1700

Entries Mean RMS 800 1630. 16.81

Hut 0.11.6

Hut 0.11.6 TDC counts

Events

HImean = 728.4 LOmean = 25.4

LP calibrations Calib 8590.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1724. 2.503

Hut 0.11.7 TDC counts

Events

0

100

1700 1750 1800

Entries Mean RMS 800 1724. 2.503

Hut 0.11.7

Hut 0.11.7 TDC counts

Events

HImean = 754.5 LOmean = 23.2

0

50

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1739. 5.467

Hut 0.11.8 TDC counts

Events

0

50

100

1700 1750 1800

Entries Mean RMS 800 1739. 5.467

Hut 0.11.8

Hut 0.11.8 TDC counts

Events

HImean = 584.6 LOmean = 20.3

0

50

0 1000 2000 3000 4000

Entries Mean RMS 800 1641. 4.606

Hut 0.11.9 TDC counts

Events

0

50

1600 1650 1700

Entries Mean RMS 800 1641. 4.606

Hut 0.11.9

Hut 0.11.9 TDC counts

Events

HImean = 401.4 LOmean = 15.9

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1476. 2.296

Hut 0.11.10 TDC counts

Events

0

100

200

1450 1500 1550

Entries Mean RMS 800 1476. 2.296

Hut 0.11.10

Hut 0.11.10 TDC counts

Events

HImean = 652.1 LOmean = 30.6

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1589. 2.356

Hut 0.12.1 TDC counts

Events

0

100

200

1550 1600 1650

Entries Mean RMS 800 1589. 2.356

Hut 0.12.1

Hut 0.12.1 TDC counts

Events

HImean = 674.9 LOmean = 15.7

LP calibrations Calib 8590.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1614. 2.333

Hut 0.12.2 TDC counts

Events

0

100

200

1600 1650 1700

Entries Mean RMS 800 1614. 2.333

Hut 0.12.2

Hut 0.12.2 TDC counts

Events

HImean = 521.6 LOmean = 22.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1280. 2.720

Hut 0.12.3 TDC counts

Events

0

100

1250 1300 1350

Entries Mean RMS 800 1280. 2.720

Hut 0.12.3

Hut 0.12.3 TDC counts

Events

HImean = 623.7 LOmean = 343.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1608. 2.749

Hut 0.12.4 TDC counts

Events

0

100

1600 1650 1700

Entries Mean RMS 800 1608. 2.749

Hut 0.12.4

Hut 0.12.4 TDC counts

Events

HImean = 582.6 LOmean = 24.0

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1484. 2.169

Hut 0.12.5 TDC counts

Events

0

100

200

1450 1500 1550

Entries Mean RMS 800 1484. 2.169

Hut 0.12.5

Hut 0.12.5 TDC counts

Events

HImean = 834.5 LOmean = 26.6

0 100 200

0 1000 2000 3000 4000

Entries Mean RMS 800 1719. 2.400

Hut 0.12.6 TDC counts

Events

0 100 200

1700 1750 1800

Entries Mean RMS 800 1719. 2.400

Hut 0.12.6

Hut 0.12.6 TDC counts

Events

HImean = 625.2 LOmean = 13.6

LP calibrations Calib 8590.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1440. 2.750

Hut 0.12.7 TDC counts

Events

0

100

200

1400 1450 1500

Entries Mean RMS 800 1440. 2.750

Hut 0.12.7

Hut 0.12.7 TDC counts

Events

HImean = 742.7 LOmean = 356.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1612. 2.730

Hut 0.12.8 TDC counts

Events

0

100

1600 1650 1700

Entries Mean RMS 800 1612. 2.730

Hut 0.12.8

Hut 0.12.8 TDC counts

Events

HImean = 523.9 LOmean = 20.6

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 1681. 2.861

Hut 0.12.9 TDC counts

Events

0 50 100

1650 1700 1750

Entries Mean RMS 800 1681. 2.861

Hut 0.12.9

Hut 0.12.9 TDC counts

Events

HImean = 715.2 LOmean = 27.4

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 0.12.10 TDC counts

Events

0

500

0 25 50 75 100

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 0.12.10

Hut 0.12.10 TDC counts

Events

HImean = 423.9 LOmean = 127.6

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1487. 2.534

Hut 0.13.1 TDC counts

Events

0

100

200

1450 1500 1550

Entries Mean RMS 800 1487. 2.534

Hut 0.13.1

Hut 0.13.1 TDC counts

Events

HImean = 681.1 LOmean = 31.1

LP calibrations Calib 8590.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1657. 2.484

Hut 0.13.2 TDC counts

Events

0

100

1650 1700 1750

Entries Mean RMS 800 1657. 2.484

Hut 0.13.2

Hut 0.13.2 TDC counts

Events

HImean = 619.2 LOmean = 9.3

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 1664. 3.001

Hut 0.13.3 TDC counts

Events

0 50 100

1650 1700 1750

Entries Mean RMS 800 1664. 3.001

Hut 0.13.3

Hut 0.13.3 TDC counts

Events

HImean = 540.4 LOmean = 19.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1717. 2.814

Hut 0.13.4 TDC counts

Events

0

100

1700 1750 1800

Entries Mean RMS 800 1717. 2.814

Hut 0.13.4

Hut 0.13.4 TDC counts

Events

HImean = 646.5 LOmean = 14.4

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 1656. 2.679

Hut 0.13.5 TDC counts

Events

0 50 100

1650 1700 1750

Entries Mean RMS 800 1656. 2.679

Hut 0.13.5

Hut 0.13.5 TDC counts

Events

HImean = 864.3 LOmean = 14.8

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 1626. 4.545

Hut 0.13.6 TDC counts

Events

0 50 100

1600 1650 1700

Entries Mean RMS 800 1626. 4.545

Hut 0.13.6

Hut 0.13.6 TDC counts

Events

HImean = 707.9 LOmean = 29.9

LP calibrations Calib 8590.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1626. 2.700

Hut 0.13.7 TDC counts

Events

0

100

1600 1650 1700

Entries Mean RMS 800 1626. 2.700

Hut 0.13.7

Hut 0.13.7 TDC counts

Events

HImean = 642.4 LOmean = 19.8

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1662. 2.192

Hut 0.13.8 TDC counts

Events

0

100

200

1650 1700 1750

Entries Mean RMS 800 1662. 2.192

Hut 0.13.8

Hut 0.13.8 TDC counts

Events

HImean = 571.2 LOmean = 27.7

0

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1651. 2.361

Hut 0.13.9 TDC counts

Events

0

200

1650 1700 1750

Entries Mean RMS 800 1651. 2.361

Hut 0.13.9

Hut 0.13.9 TDC counts

Events

HImean = 830.3 LOmean = 11.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1730. 2.164

Hut 0.13.10 TDC counts

Events

0

100

1700 1750 1800

Entries Mean RMS 800 1730. 2.164

Hut 0.13.10

Hut 0.13.10 TDC counts

Events

HImean = 691.2 LOmean = 10.5

0

50

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1339. 3.973

Hut 0.14.2 TDC counts

Events

0

50

100

1300 1350 1400

Entries Mean RMS 800 1339. 3.973

Hut 0.14.2

Hut 0.14.2 TDC counts

Events

HImean = 644.6 LOmean = 17.6

LP calibrations Calib 8590.1

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 1416. 3.145

Hut 0.14.3 TDC counts

Events

0 50 100

1400 1450 1500

Entries Mean RMS 800 1416. 3.145

Hut 0.14.3

Hut 0.14.3 TDC counts

Events

HImean = 682.4 LOmean = 25.3

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1700. 2.346

Hut 0.14.4 TDC counts

Events

0

100

200

1650 1700 1750 1800

Entries Mean RMS 800 1700. 2.346

Hut 0.14.4

Hut 0.14.4 TDC counts

Events

HImean = 876.8 LOmean = 28.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1589. 2.757

Hut 0.14.5 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1589. 2.757

Hut 0.14.5

Hut 0.14.5 TDC counts

Events

HImean = 712.3 LOmean = 18.5

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 1666. 59.06

Hut 0.14.6 TDC counts

Events

0 50 100

1650 1700 1750

Entries Mean RMS 800 1666. 59.06

Hut 0.14.6

Hut 0.14.6 TDC counts

Events

HImean = 588.9 LOmean = 26.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1403. 2.518

Hut 0.14.7 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1403. 2.518

Hut 0.14.7

Hut 0.14.7 TDC counts

Events

HImean = 757.9 LOmean = 346.7

LP calibrations Calib 8590.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1657. 2.104

Hut 0.14.8 TDC counts

Events

0

100

200

1650 1700 1750

Entries Mean RMS 800 1657. 2.104

Hut 0.14.8

Hut 0.14.8 TDC counts

Events

HImean = 581.9 LOmean = 25.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1563. 2.713

Hut 0.14.9 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1563. 2.713

Hut 0.14.9

Hut 0.14.9 TDC counts

Events

HImean = 833.2 LOmean = 19.1

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 1425. 3.192

Hut 0.14.10 TDC counts

Events

0 50 100

1400 1450 1500

Entries Mean RMS 800 1425. 3.192

Hut 0.14.10

Hut 0.14.10 TDC counts

Events

HImean = 479.8 LOmean = 32.2

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

26.69 / 13 P1 -1555. P2 168.0

icalid

(TDC counts)

Hut 0.2.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.2.2

Hut 0.2.2 icalid

Δfit (TDC counts)

0.148802 ns/TDCcount

0

2000

4000

10 20 30

60.10 / 13 P1 -1500. P2 168.0

icalid

(TDC counts)

Hut 0.2.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.2.3

Hut 0.2.3 icalid

Δfit (TDC counts)

0.148778 ns/TDCcount

0

2000

4000

10 20 30

153.0 / 13 P1 -1576. P2 168.6

icalid

(TDC counts)

Hut 0.2.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.2.4

Hut 0.2.4 icalid

Δfit (TDC counts)

0.148298 ns/TDCcount

0

2000

4000

10 20 30

77.51 / 13 P1 -1486. P2 168.1

icalid

(TDC counts)

Hut 0.2.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.2.5

Hut 0.2.5 icalid

Δfit (TDC counts)

0.148681 ns/TDCcount

0

2000

4000

10 20 30

66.53 / 13 P1 -1509. P2 168.2

icalid

(TDC counts)

Hut 0.2.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.2.6

Hut 0.2.6 icalid

Δfit (TDC counts)

0.148667 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

122.2 / 12 P1 -1514. P2 168.6

icalid

(TDC counts)

Hut 0.2.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.2.7

Hut 0.2.7 icalid

Δfit (TDC counts)

0.148244 ns/TDCcount

0

2000

4000

10 20 30

33.62 / 13 P1 -1540. P2 167.8

icalid

(TDC counts)

Hut 0.2.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.2.8

Hut 0.2.8 icalid

Δfit (TDC counts)

0.148965 ns/TDCcount

0

2000

4000

10 20 30

27.30 / 12 P1 -1524. P2 168.0

icalid

(TDC counts)

Hut 0.2.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.2.9

Hut 0.2.9 icalid

Δfit (TDC counts)

0.148825 ns/TDCcount

0

2000

4000

10 20 30

20.53 / 12 P1 -1523. P2 168.0

icalid

(TDC counts)

Hut 0.2.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.2.10

Hut 0.2.10 icalid

Δfit (TDC counts)

0.148853 ns/TDCcount

0

2000

4000

10 20 30

105.1 / 12 P1 -1519. P2 168.6

icalid

(TDC counts)

Hut 0.3.1

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.3.1

Hut 0.3.1 icalid

Δfit (TDC counts)

0.148284 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

19.78 / 12 P1 -1515. P2 167.9

icalid

(TDC counts)

Hut 0.3.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.3.2

Hut 0.3.2 icalid

Δfit (TDC counts)

0.148857 ns/TDCcount

0

2000

4000

10 20 30

76.99 / 12 P1 -1523. P2 168.3

icalid

(TDC counts)

Hut 0.3.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.3.3

Hut 0.3.3 icalid

Δfit (TDC counts)

0.148566 ns/TDCcount

0

2000

4000

10 20 30

68.04 / 13 P1 -1488. P2 168.1

icalid

(TDC counts)

Hut 0.3.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.3.4

Hut 0.3.4 icalid

Δfit (TDC counts)

0.148685 ns/TDCcount

0

2000

4000

10 20 30

38.54 / 12 P1 -1513. P2 168.1

icalid

(TDC counts)

Hut 0.3.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.3.5

Hut 0.3.5 icalid

Δfit (TDC counts)

0.148748 ns/TDCcount

0

2000

4000

10 20 30

114.6 / 13 P1 -1515. P2 168.4

icalid

(TDC counts)

Hut 0.3.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.3.6

Hut 0.3.6 icalid

Δfit (TDC counts)

0.148493 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

10.27 / 12 P1 -1514. P2 167.8

icalid

(TDC counts)

Hut 0.3.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.3.7

Hut 0.3.7 icalid

Δfit (TDC counts)

0.148987 ns/TDCcount

0

2000

4000

10 20 30

77.27 / 13 P1 -1497. P2 168.2

icalid

(TDC counts)

Hut 0.3.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.3.8

Hut 0.3.8 icalid

Δfit (TDC counts)

0.148664 ns/TDCcount

0

2000

4000

10 20 30

33.97 / 13 P1 -1538. P2 168.0

icalid

(TDC counts)

Hut 0.3.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.3.9

Hut 0.3.9 icalid

Δfit (TDC counts)

0.148825 ns/TDCcount

0

2000

4000

10 20 30

142.1 / 13 P1 -1496. P2 168.5

icalid

(TDC counts)

Hut 0.3.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.3.10

Hut 0.3.10 icalid

Δfit (TDC counts)

0.148397 ns/TDCcount

0

2000

4000

10 20 30

38.33 / 13 P1 -1476. P2 167.9

icalid

(TDC counts)

Hut 0.4.1

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.4.1

Hut 0.4.1 icalid

Δfit (TDC counts)

0.1489 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

9.988 / 12 P1 -1525. P2 167.9

icalid

(TDC counts)

Hut 0.4.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.4.2

Hut 0.4.2 icalid

Δfit (TDC counts)

0.148907 ns/TDCcount

0

2000

4000

10 20 30

78.34 / 13 P1 -1505. P2 168.3

icalid

(TDC counts)

Hut 0.4.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.4.3

Hut 0.4.3 icalid

Δfit (TDC counts)

0.148523 ns/TDCcount

0

2000

4000

10 20 30

27.96 / 12 P1 -1535. P2 168.2

icalid

(TDC counts)

Hut 0.4.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.4.4

Hut 0.4.4 icalid

Δfit (TDC counts)

0.148626 ns/TDCcount

0

2000

4000

10 20 30

46.93 / 13 P1 -1578. P2 168.2

icalid

(TDC counts)

Hut 0.4.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.4.5

Hut 0.4.5 icalid

Δfit (TDC counts)

0.148626 ns/TDCcount

0

2000

4000

10 20 30

190.1 / 13 P1 -1511. P2 168.9

icalid

(TDC counts)

Hut 0.4.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.4.6

Hut 0.4.6 icalid

Δfit (TDC counts)

0.148029 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

24.31 / 13 P1 -1499. P2 167.9

icalid

(TDC counts)

Hut 0.4.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.4.7

Hut 0.4.7 icalid

Δfit (TDC counts)

0.14888 ns/TDCcount

0

2000

4000

10 20 30

41.84 / 13 P1 -1507. P2 168.0

icalid

(TDC counts)

Hut 0.4.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.4.8

Hut 0.4.8 icalid

Δfit (TDC counts)

0.148766 ns/TDCcount

0

2000

4000

10 20 30

29.67 / 12 P1 -1520. P2 168.1

icalid

(TDC counts)

Hut 0.4.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.4.9

Hut 0.4.9 icalid

Δfit (TDC counts)

0.148718 ns/TDCcount

0 2000

4000

10 20 30

77.46 / 13 P1 -1466. P2 168.2

icalid

(TDC counts)

Hut 0.4.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.4.10

Hut 0.4.10 icalid

Δfit (TDC counts)

0.148631 ns/TDCcount

0

2000

4000

10 20 30

45.97 / 12 P1 -1536. P2 168.2

icalid

(TDC counts)

Hut 0.5.1

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.5.1

Hut 0.5.1 icalid

Δfit (TDC counts)

0.148664 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

58.73 / 12 P1 -1530. P2 168.2

icalid

(TDC counts)

Hut 0.5.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.5.2

Hut 0.5.2 icalid

Δfit (TDC counts)

0.148664 ns/TDCcount

0

2000

4000

10 20 30

43.21 / 13 P1 -1508. P2 168.0

icalid

(TDC counts)

Hut 0.5.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.5.3

Hut 0.5.3 icalid

Δfit (TDC counts)

0.148786 ns/TDCcount

0

2000

4000

10 20 30

94.25 / 12 P1 -1530. P2 168.4

icalid

(TDC counts)

Hut 0.5.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.5.4

Hut 0.5.4 icalid

Δfit (TDC counts)

0.148416 ns/TDCcount

0

2000

4000

10 20 30

18.36 / 13 P1 -1472. P2 167.9

icalid

(TDC counts)

Hut 0.5.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.5.5

Hut 0.5.5 icalid

Δfit (TDC counts)

0.148933 ns/TDCcount

0

2000

4000

10 20 30

25.85 / 13 P1 -1546. P2 168.0

icalid

(TDC counts)

Hut 0.5.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.5.6

Hut 0.5.6 icalid

Δfit (TDC counts)

0.148797 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

24.50 / 12 P1 -1527. P2 168.1

icalid

(TDC counts)

Hut 0.5.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.5.7

Hut 0.5.7 icalid

Δfit (TDC counts)

0.148756 ns/TDCcount

0

2000

4000

10 20 30

39.80 / 13 P1 -1486. P2 168.0

icalid

(TDC counts)

Hut 0.5.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.5.8

Hut 0.5.8 icalid

Δfit (TDC counts)

0.148818 ns/TDCcount

0

2000

4000

10 20 30

102.8 / 13 P1 -1500. P2 168.4

icalid

(TDC counts)

Hut 0.5.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.5.9

Hut 0.5.9 icalid

Δfit (TDC counts)

0.14847 ns/TDCcount

0

2000

4000

10 20 30

147.2 / 13 P1 -1499. P2 168.5

icalid

(TDC counts)

Hut 0.5.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.5.10

Hut 0.5.10 icalid

Δfit (TDC counts)

0.148402 ns/TDCcount

0

2000

4000

10 20 30

10.10 / 13 P1 -1727. P2 167.9

icalid

(TDC counts)

Hut 0.6.1

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.6.1

Hut 0.6.1 icalid

Δfit (TDC counts)

0.148898 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

4.293 / 13 P1 -1721. P2 167.8

icalid

(TDC counts)

Hut 0.6.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.6.2

Hut 0.6.2 icalid

Δfit (TDC counts)

0.14897 ns/TDCcount

0

2000

4000

10 20 30

2.858 / 12 P1 -1701. P2 168.1

icalid

(TDC counts)

Hut 0.6.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.6.3

Hut 0.6.3 icalid

Δfit (TDC counts)

0.148745 ns/TDCcount

0

2000

4000

10 20 30

107.2 / 13 P1 -1683. P2 168.8

icalid

(TDC counts)

Hut 0.6.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.6.4

Hut 0.6.4 icalid

Δfit (TDC counts)

0.148093 ns/TDCcount

0

2000

4000

10 20 30

8.181 / 13 P1 -1720. P2 168.2

icalid

(TDC counts)

Hut 0.6.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.6.5

Hut 0.6.5 icalid

Δfit (TDC counts)

0.14867 ns/TDCcount

0

2000

4000

10 20 30

3.490 / 12 P1 -1698. P2 168.1

icalid

(TDC counts)

Hut 0.6.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.6.6

Hut 0.6.6 icalid

Δfit (TDC counts)

0.148724 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

14.01 / 13 P1 -1676. P2 168.3

icalid

(TDC counts)

Hut 0.6.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.6.7

Hut 0.6.7 icalid

Δfit (TDC counts)

0.148539 ns/TDCcount

0

2000

4000

10 20 30

12.01 / 13 P1 -1686. P2 168.2

icalid

(TDC counts)

Hut 0.6.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.6.8

Hut 0.6.8 icalid

Δfit (TDC counts)

0.148667 ns/TDCcount

0

2000

4000

10 20 30

6.496 / 12 P1 -1698. P2 168.2

icalid

(TDC counts)

Hut 0.6.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.6.9

Hut 0.6.9 icalid

Δfit (TDC counts)

0.148599 ns/TDCcount

0

2000

4000

10 20 30

5.312 / 13 P1 -1718. P2 168.0

icalid

(TDC counts)

Hut 0.6.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.6.10

Hut 0.6.10 icalid

Δfit (TDC counts)

0.148847 ns/TDCcount

0

2000

4000

10 20 30

123.2 / 13 P1 -1663. P2 168.2

icalid

(TDC counts)

Hut 0.7.1

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.7.1

Hut 0.7.1 icalid

Δfit (TDC counts)

0.14859 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

3.132 / 12 P1 -1703. P2 168.0

icalid

(TDC counts)

Hut 0.7.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.7.2

Hut 0.7.2 icalid

Δfit (TDC counts)

0.148771 ns/TDCcount

0

2000

4000

10 20 30

5.812 / 12 P1 -1708. P2 168.2

icalid

(TDC counts)

Hut 0.7.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.7.3

Hut 0.7.3 icalid

Δfit (TDC counts)

0.14867 ns/TDCcount

0

2000

4000

10 20 30

8.736 / 13 P1 -1671. P2 168.3

icalid

(TDC counts)

Hut 0.7.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.7.4

Hut 0.7.4 icalid

Δfit (TDC counts)

0.148588 ns/TDCcount

0

2000

4000

10 20 30

17.24 / 13 P1 -1650. P2 168.3

icalid

(TDC counts)

Hut 0.7.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.7.5

Hut 0.7.5 icalid

Δfit (TDC counts)

0.148546 ns/TDCcount

0

2000

4000

10 20 30

16.03 / 12 P1 -1696. P2 168.4

icalid

(TDC counts)

Hut 0.7.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.7.6

Hut 0.7.6 icalid

Δfit (TDC counts)

0.148435 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

4.657 / 13 P1 -1651. P2 167.9

icalid

(TDC counts)

Hut 0.7.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.7.7

Hut 0.7.7 icalid

Δfit (TDC counts)

0.148858 ns/TDCcount

0

2000

4000

10 20 30

14.20 / 13 P1 -1652. P2 168.4

icalid

(TDC counts)

Hut 0.7.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.7.8

Hut 0.7.8 icalid

Δfit (TDC counts)

0.148468 ns/TDCcount

0

2000

4000

10 20 30

3.215 / 13 P1 -1752. P2 168.2

icalid

(TDC counts)

Hut 0.7.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.7.9

Hut 0.7.9 icalid

Δfit (TDC counts)

0.148669 ns/TDCcount

0

2000

4000

10 20 30

15.98 / 13 P1 -1675. P2 168.1

icalid

(TDC counts)

Hut 0.7.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.7.10

Hut 0.7.10 icalid

Δfit (TDC counts)

0.148714 ns/TDCcount

0

2000

4000

10 20 30

5.374 / 13 P1 -1688. P2 168.2

icalid

(TDC counts)

Hut 0.8.1

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.8.1

Hut 0.8.1 icalid

Δfit (TDC counts)

0.148616 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

5.468 / 12 P1 -1696. P2 168.2

icalid

(TDC counts)

Hut 0.8.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.8.2

Hut 0.8.2 icalid

Δfit (TDC counts)

0.148615 ns/TDCcount

0

2000

4000

10 20 30

4.135 / 13 P1 -1686. P2 168.2

icalid

(TDC counts)

Hut 0.8.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.8.3

Hut 0.8.3 icalid

Δfit (TDC counts)

0.148648 ns/TDCcount

0

2000

4000

10 20 30

39.40 / 13 P1 -1668. P2 168.4

icalid

(TDC counts)

Hut 0.8.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.8.4

Hut 0.8.4 icalid

Δfit (TDC counts)

0.148422 ns/TDCcount

0

2000

4000

10 20 30

2.935 / 13 P1 -1748. P2 168.0

icalid

(TDC counts)

Hut 0.8.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.8.5

Hut 0.8.5 icalid

Δfit (TDC counts)

0.148823 ns/TDCcount

0

2000

4000

10 20 30

2.700 / 13 P1 -1733. P2 167.9

icalid

(TDC counts)

Hut 0.8.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.8.6

Hut 0.8.6 icalid

Δfit (TDC counts)

0.148884 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

3.293 / 13 P1 -1748. P2 168.0

icalid

(TDC counts)

Hut 0.8.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.8.7

Hut 0.8.7 icalid

Δfit (TDC counts)

0.148802 ns/TDCcount

0

2000

4000

10 20 30

3.286 / 12 P1 -1701. P2 167.9

icalid

(TDC counts)

Hut 0.8.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.8.8

Hut 0.8.8 icalid

Δfit (TDC counts)

0.148868 ns/TDCcount

0

2000

4000

10 20 30

1.980 / 12 P1 -1691. P2 167.9

icalid

(TDC counts)

Hut 0.8.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.8.9

Hut 0.8.9 icalid

Δfit (TDC counts)

0.148916 ns/TDCcount

0

2000

4000

10 20 30

6.417 / 13 P1 -1661. P2 168.1

icalid

(TDC counts)

Hut 0.8.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.8.10

Hut 0.8.10 icalid

Δfit (TDC counts)

0.148753 ns/TDCcount

0

2000

4000

10 20 30

2.302 / 13 P1 -1736. P2 168.0

icalid

(TDC counts)

Hut 0.9.1

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.9.1

Hut 0.9.1 icalid

Δfit (TDC counts)

0.148805 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

3.123 / 13 P1 -1729. P2 167.9

icalid

(TDC counts)

Hut 0.9.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.9.2

Hut 0.9.2 icalid

Δfit (TDC counts)

0.148919 ns/TDCcount

0

2000

4000

10 20 30

6.133 / 13 P1 -1686. P2 168.1

icalid

(TDC counts)

Hut 0.9.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.9.3

Hut 0.9.3 icalid

Δfit (TDC counts)

0.148743 ns/TDCcount

0

2000

4000

10 20 30

17.79 / 13 P1 -1669. P2 168.3

icalid

(TDC counts)

Hut 0.9.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.9.4

Hut 0.9.4 icalid

Δfit (TDC counts)

0.148536 ns/TDCcount

0

2000

4000

10 20 30

9.149 / 13 P1 -1685. P2 168.3

icalid

(TDC counts)

Hut 0.9.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.9.5

Hut 0.9.5 icalid

Δfit (TDC counts)

0.148514 ns/TDCcount

0

2000

4000

10 20 30

22.61 / 13 P1 -1681. P2 168.3

icalid

(TDC counts)

Hut 0.9.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.9.6

Hut 0.9.6 icalid

Δfit (TDC counts)

0.148565 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

5.233 / 12 P1 -1701. P2 168.1

icalid

(TDC counts)

Hut 0.9.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.9.7

Hut 0.9.7 icalid

Δfit (TDC counts)

0.14871 ns/TDCcount

0

2000

4000

10 20 30

1.828 / 12 P1 -1709. P2 168.1

icalid

(TDC counts)

Hut 0.9.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.9.8

Hut 0.9.8 icalid

Δfit (TDC counts)

0.148709 ns/TDCcount

0

2000

4000

10 20 30

7.477 / 13 P1 -1679. P2 168.1

icalid

(TDC counts)

Hut 0.9.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.9.9

Hut 0.9.9 icalid

Δfit (TDC counts)

0.148739 ns/TDCcount

0

2000

4000

10 20 30

9.659 / 13 P1 -1644. P2 168.1

icalid

(TDC counts)

Hut 0.9.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.9.10

Hut 0.9.10 icalid

Δfit (TDC counts)

0.148678 ns/TDCcount

0

2000

4000

10 20 30

73.06 / 13 P1 -1509. P2 167.8

icalid

(TDC counts)

Hut 0.10.1

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.10.1

Hut 0.10.1 icalid

Δfit (TDC counts)

0.149021 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

9.631 / 12 P1 -1516. P2 167.8

icalid

(TDC counts)

Hut 0.10.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 0.10.2

Hut 0.10.2 icalid

Δfit (TDC counts)

0.14899 ns/TDCcount

0

2000

4000

10 20 30

97.68 / 13

P1 -1505.

P2 168.1

icalid

(TDC counts)

Hut 0.10.3

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.10.3

Hut 0.10.3 icalid

Δfit (TDC counts)

0.148695 ns/TDCcount

0

2000

4000

10 20 30

254.2 / 13

P1 -1509.

P2 168.7

icalid

(TDC counts)

Hut 0.10.4

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.10.4

Hut 0.10.4 icalid

Δfit (TDC counts)

0.148206 ns/TDCcount

0

2000

4000

10 20 30

18.94 / 12

P1 -1511.

P2 167.9

icalid

(TDC counts)

Hut 0.10.5

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.10.5

Hut 0.10.5 icalid

Δfit (TDC counts)

0.14894 ns/TDCcount

0

2000

4000

10 20 30

9.694 / 13

P1 -1536.

P2 167.6

icalid

(TDC counts)

Hut 0.10.6

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.10.6

Hut 0.10.6 icalid

Δfit (TDC counts)

0.149207 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

48.59 / 13

P1 -1503.

P2 167.8

icalid

(TDC counts)

Hut 0.10.7

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.10.7

Hut 0.10.7 icalid

Δfit (TDC counts)

0.148964 ns/TDCcount

0

2000

4000

10 20 30

58.61 / 13

P1 -1504.

P2 167.8

icalid

(TDC counts)

Hut 0.10.8

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.10.8

Hut 0.10.8 icalid

Δfit (TDC counts)

0.148994 ns/TDCcount

0

2000

4000

10 20 30

73.48 / 12

P1 -1540.

P2 168.4

icalid

(TDC counts)

Hut 0.10.9

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.10.9

Hut 0.10.9 icalid

Δfit (TDC counts)

0.148475 ns/TDCcount

0

2000

4000

10 20 30

23.31 / 13

P1 -1500.

P2 167.8

icalid

(TDC counts)

Hut 0.10.10

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.10.10

Hut 0.10.10 icalid

Δfit (TDC counts)

0.148959 ns/TDCcount

0

2000

4000

10 20 30

16.54 / 12

P1 -1525.

P2 167.8

icalid

(TDC counts)

Hut 0.11.1

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.11.1

Hut 0.11.1 icalid

Δfit (TDC counts)

0.149014 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

56.98 / 13

P1 -1510.

P2 167.8

icalid

(TDC counts)

Hut 0.11.2

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.11.2

Hut 0.11.2 icalid

Δfit (TDC counts)

0.149006 ns/TDCcount

0

2000

4000

10 20 30

33.93 / 13

P1 -1505.

P2 167.8

icalid

(TDC counts)

Hut 0.11.3

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.11.3

Hut 0.11.3 icalid

Δfit (TDC counts)

0.148993 ns/TDCcount

0

2000

4000

10 20 30

1.999 / 12

P1 -1516.

P2 167.3

icalid

(TDC counts)

Hut 0.11.4

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.11.4

Hut 0.11.4 icalid

Δfit (TDC counts)

0.149441 ns/TDCcount

0

2000

4000

10 20 30

45.50 / 13

P1 -1501.

P2 168.1

icalid

(TDC counts)

Hut 0.11.5

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.11.5

Hut 0.11.5 icalid

Δfit (TDC counts)

0.148742 ns/TDCcount

0

2000

4000

10 20 30

13.03 / 12

P1 -1519.

P2 167.7

icalid

(TDC counts)

Hut 0.11.6

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.11.6

Hut 0.11.6 icalid

Δfit (TDC counts)

0.149053 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

44.74 / 13

P1 -1472.

P2 167.9

icalid

(TDC counts)

Hut 0.11.7

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.11.7

Hut 0.11.7 icalid

Δfit (TDC counts)

0.148907 ns/TDCcount

0

2000

4000

10 20 30

52.44 / 13

P1 -1502.

P2 168.0

icalid

(TDC counts)

Hut 0.11.8

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.11.8

Hut 0.11.8 icalid

Δfit (TDC counts)

0.14884 ns/TDCcount

0

2000

4000

10 20 30

38.43 / 12

P1 -1535.

P2 168.2

icalid

(TDC counts)

Hut 0.11.9

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.11.9

Hut 0.11.9 icalid

Δfit (TDC counts)

0.148648 ns/TDCcount

0

2000

4000

10 20 30

10.38 / 12

P1 -1517.

P2 167.7

icalid

(TDC counts)

Hut 0.11.10

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.11.10

Hut 0.11.10 icalid

Δfit (TDC counts)

0.149115 ns/TDCcount

0

2000

4000

10 20 30

16.92 / 13

P1 -1372.

P2 168.0

icalid

(TDC counts)

Hut 0.12.1

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.12.1

Hut 0.12.1 icalid

Δfit (TDC counts)

0.14881 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

27.41 / 13

P1 -1432.

P2 168.0

icalid

(TDC counts)

Hut 0.12.2

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.12.2

Hut 0.12.2 icalid

Δfit (TDC counts)

0.148771 ns/TDCcount

0

2000

4000

10 20 30

22.59 / 13

P1 -1580.

P2 167.8

icalid

(TDC counts)

Hut 0.12.3

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.12.3

Hut 0.12.3 icalid

Δfit (TDC counts)

0.148968 ns/TDCcount

0

2000

4000

10 20 30

15.89 / 13

P1 -1423.

P2 168.0

icalid

(TDC counts)

Hut 0.12.4

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.12.4

Hut 0.12.4 icalid

Δfit (TDC counts)

0.148835 ns/TDCcount

0

2000

4000

10 20 30

2.247 / 12

P1 -1688.

P2 168.0

icalid

(TDC counts)

Hut 0.12.5

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.12.5

Hut 0.12.5 icalid

Δfit (TDC counts)

0.148804 ns/TDCcount

0

2000

4000

10 20 30

15.44 / 12

P1 -1351.

P2 168.1

icalid

(TDC counts)

Hut 0.12.6

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.12.6

Hut 0.12.6 icalid

Δfit (TDC counts)

0.14874 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

113.0 / 13

P1 -1432.

P2 168.8

icalid

(TDC counts)

Hut 0.12.7

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.12.7

Hut 0.12.7 icalid

Δfit (TDC counts)

0.148132 ns/TDCcount

0

2000

4000

10 20 30

53.89 / 12

P1 -1527.

P2 168.1

icalid

(TDC counts)

Hut 0.12.8

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.12.8

Hut 0.12.8 icalid

Δfit (TDC counts)

0.148701 ns/TDCcount

0

2000

4000

10 20 30

256.1 / 13

P1 -1510.

P2 168.7

icalid

(TDC counts)

Hut 0.12.9

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.12.9

Hut 0.12.9 icalid

Δfit (TDC counts)

0.148171 ns/TDCcount

0

2000

4000

10 20 30

173.5 / 13

P1 -1493.

P2 168.4

icalid

(TDC counts)

Hut 0.12.10

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.12.10

Hut 0.12.10 icalid

Δfit (TDC counts)

0.14846 ns/TDCcount

0

2000

4000

10 20 30

82.32 / 13

P1 -1512.

P2 168.3

icalid

(TDC counts)

Hut 0.13.1

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.13.1

Hut 0.13.1 icalid

Δfit (TDC counts)

0.148587 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

12.74 / 13

P1 -1535.

P2 167.8

icalid

(TDC counts)

Hut 0.13.2

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.13.2

Hut 0.13.2 icalid

Δfit (TDC counts)

0.14903 ns/TDCcount

0

2000

4000

10 20 30

3.831 / 13

P1 -1530.

P2 167.6

icalid

(TDC counts)

Hut 0.13.3

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.13.3

Hut 0.13.3 icalid

Δfit (TDC counts)

0.149153 ns/TDCcount

0

2000

4000

10 20 30

23.40 / 13

P1 -1473.

P2 167.8

icalid

(TDC counts)

Hut 0.13.4

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.13.4

Hut 0.13.4 icalid

Δfit (TDC counts)

0.148977 ns/TDCcount

0

2000

4000

10 20 30

28.11 / 13

P1 -1543.

P2 167.8

icalid

(TDC counts)

Hut 0.13.5

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.13.5

Hut 0.13.5 icalid

Δfit (TDC counts)

0.148997 ns/TDCcount

0

2000

4000

10 20 30

29.08 / 12

P1 -1538.

P2 168.0

icalid

(TDC counts)

Hut 0.13.6

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.13.6

Hut 0.13.6 icalid

Δfit (TDC counts)

0.148833 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

39.88 / 13

P1 -1496.

P2 167.8

icalid

(TDC counts)

Hut 0.13.7

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.13.7

Hut 0.13.7 icalid

Δfit (TDC counts)

0.14895 ns/TDCcount

0

2000

4000

10 20 30

4.093 / 12

P1 -1513.

P2 167.6

icalid

(TDC counts)

Hut 0.13.8

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.13.8

Hut 0.13.8 icalid

Δfit (TDC counts)

0.149191 ns/TDCcount

0

2000

4000

10 20 30

21.25 / 13

P1 -1505.

P2 167.8

icalid

(TDC counts)

Hut 0.13.9

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.13.9

Hut 0.13.9 icalid

Δfit (TDC counts)

0.149023 ns/TDCcount

0

2000

4000

10 20 30

45.01 / 13

P1 -1500.

P2 168.0

icalid

(TDC counts)

Hut 0.13.10

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.13.10

Hut 0.13.10 icalid

Δfit (TDC counts)

0.148799 ns/TDCcount

0

2000

4000

10 20 30

19.04 / 13

P1 -1642.

P2 167.7

icalid

(TDC counts)

Hut 0.14.2

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.14.2

Hut 0.14.2 icalid

Δfit (TDC counts)

0.149086 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

17.43 / 13

P1 -1610.

P2 167.8

icalid

(TDC counts)

Hut 0.14.3

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.14.3

Hut 0.14.3 icalid

Δfit (TDC counts)

0.148996 ns/TDCcount

0

2000

4000

10 20 30

23.65 / 12

P1 -1519.

P2 167.7

icalid

(TDC counts)

Hut 0.14.4

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.14.4

Hut 0.14.4 icalid

Δfit (TDC counts)

0.149083 ns/TDCcount

0

2000

4000

10 20 30

10.95 / 13

P1 -1644.

P2 167.8

icalid

(TDC counts)

Hut 0.14.5

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.14.5

Hut 0.14.5 icalid

Δfit (TDC counts)

0.149006 ns/TDCcount

0

2000

4000

10 20 30

13.37 / 13

P1 -1595.

P2 167.7

icalid

(TDC counts)

Hut 0.14.6

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.14.6

Hut 0.14.6 icalid

Δfit (TDC counts)

0.149098 ns/TDCcount

0

2000

4000

10 20 30

11.35 / 13

P1 -1570.

P2 167.6

icalid

(TDC counts)

Hut 0.14.7

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.14.7

Hut 0.14.7 icalid

Δfit (TDC counts)

0.149163 ns/TDCcount

TDC calibrations Calib 8590.1

0

2000

4000

10 20 30

11.92 / 13

P1 -1618.

P2 167.7

icalid

(TDC counts)

Hut 0.14.8

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.14.8

Hut 0.14.8 icalid

Δfit (TDC counts)

0.14905 ns/TDCcount

0

2000

4000

10 20 30

60.96 / 13

P1 -1611.

P2 168.2

icalid

(TDC counts)

Hut 0.14.9

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.14.9

Hut 0.14.9 icalid

Δfit (TDC counts)

0.148655 ns/TDCcount

0

2000

4000

10 20 30

7.916 / 13

P1 -1604.

P2 167.6

icalid

(TDC counts)

Hut 0.14.10

Only fitted points shown

-10

0

10

0 10 20 30

Hut 0.14.10

Hut 0.14.10 icalid

Δfit (TDC counts)

0.149204 ns/TDCcount